\documentclass[a4paper]{article}

\title{Sensyne Tech Test\\ Notes and explainations}
\date{\today}
\author{Spike Lampson}


\begin{document}

\maketitle
\toc

\section{Initial design}

Requirements are: Simple web app, with backend and database, deployed on a cluster of nodes via an orchestration layer. Expectation: Couple of hours, which seems very hopeful for setting up a project at all, let alone finishing it to me. Still, what to do. 

Initial plan: Create in terraform/AWS. Find basic docker webapp container, deploy that onto EKS, with RDS instance as the backend.

Things to check:
\begin{enumerate}
\item How much VPC/IG/routing etc still needs to be done by hand
\item Does EKS handle the loadbalancer?
\item Find basic docker container
\end{enumerate}


